\indent In my recent role as a Researcher ML Engineer at the \schoolName, I conducted in-depth data collection, diagnosis and analysis to identify key correlations in latency and network bandwidth.
This experience in real-time environments helped me develop a solid foundation for programming, deploying and optimzing systems under various operational conditions.
My prior work as a Software Developer on an Assistive Robotic Feeding System in ROS2 required on-the-spot troubleshooting of hardware-software integration issues, as well as coordinating with microcontrollers and sensors (ESP32, PIR) in a Smart Door application, to deliver a stable automated experience.
Additionally, my experience as an IT Analyst entailed reading electrical schematics, configuring rirewalls, and modernizing network infrastructure-further sharpening my problem-solving abilities.\\

Beyond my professional roles, I also maintain a personal home lab where I manage automations for lighting, thermostats, and security—deepening my understanding of real-time data exchange, hardware integration, and troubleshooting.
Throughout these projects, I leveraged my skills in C/C++, Python, Rust, and Java, along with Ladder Logic (PLC) knowledge, to integrate hardware and software in real-time systems. 
I also appreciate the importance of robust design documentation and functional specifications, having written and followed them closely for various edge-cloud and robotics solutions. 
My familiarity with IT/networking, databases, and version control (Git) further positions me to support Brock Solutions’ industrial automation projects from design through commissioning.\\

I also welcome the travel requirement of up to 40\% for on-site installations and system commissioning, as I thrive on hands-on involvement to make sure solutions run smoothly in real-world production. My background has prepared me to excel in roles requiring both technical depth and adaptability.\\
